<template>
	<view class="df jcc aic myComRoot">
		<view class="df aic login-center">
			<view>
				<view class="login-lefttitle1">虚拟仿真实验网站首页</view>
				<view class="login-lefttitle2">记录产品分享设计</view>
				<view class="login-leftpic">
					<img src="../../assets/login/loginPic1.png" />
				</view>
			</view>
			<!-- 中间竖线 -->
			<view class="login-middleline"></view>
			<!-- <ChooseRole v-show="visibleChooseRole" v-on:onChoose="onChoose"></ChooseRole> -->
			<LoginByPWD class="showborder" v-show="visibleLoginByPWD" v-on:onLogin="onLogin" v-on:onForget="onForget"></LoginByPWD>
			<!-- <ResetPWD v-show="visibleResetPWD" v-on:onLogin="onLogin"></ResetPWD> -->
		</view>
	</view>
</template>

<script>
	// import ChooseRole from './chooseRole.vue'
	import LoginByPWD from './loginByPWD.vue'
	// import ResetPWD from './resetPWD.vue'
	export default {
		components: {
			// ChooseRole,
			LoginByPWD,
			// ResetPWD
		},
		data() {
			return {
				// visibleChooseRole: false,
				visibleLoginByPWD: true,
				// visibleResetPWD: false,
				//当前登录类型T教师S学生
				roleType: '',
			}
		},
		methods: {
			onLogin: function() {
				// console.log("登录成功login");
				this.$emit("onLogin");
				// this.visibleChooseRole = false;
				this.visibleLoginByPWD = false;
				// this.visibleResetPWD = false;
			},
			// onChoose(type) {
			// 	console.log("onChoose", type)
			// 	this.roleType = type;
			// 	this.visibleChooseRole = false;
			// 	this.visibleLoginByPWD = true;
			// },
			// onForget() {
			// 	this.visibleLoginByPWD = false;
			// 	this.visibleResetPWD = true;
			// }
		}
	}
</script>

<style>
	.login-center {
		/* width: 1431px;
		height: 752px; */
		width: 74.5vw;
		height: 39.1vw;
		background: #FFFFFF;
		box-shadow: 0px 3px 7px 0px rgba(0, 0, 0, 0.1);
		border-radius: 10px;
		/* margin-top: 86px; */
		justify-content: space-evenly;
	}

	.login-lefttitle1 {
		/* font-size: 26px; */
		font-size: 1.4vw;
		font-family: MicrosoftYaHei;
		color: #020202;
		/* line-height: 35px; */
		line-height: 1.8vw;
		/* letter-spacing: 2px; */
		letter-spacing: 0.02vw;
	}

	.login-lefttitle2 {
		/* font-size: 20px; */
		font-size: 1.041vw;
		font-family: MicrosoftYaHei;
		color: #6C6F6E;
		/* line-height: 26px;
		letter-spacing: 1px;
		margin-top: 16px; */
		line-height: 1.4vw;
		letter-spacing: 1px;
		margin-top: 0.8vw;
	}

	.login-leftpic {
		/* margin-top: 79px;
		margin-left: 15px; */
		margin-top: 4.114vw;
		margin-left: 0.07vw;
	}

	.login-leftpic img {
		width: 17.552vw;
	}

	.login-middleline {
		width: 0.1vw;
		height: 29vw;
		background-color: #979797;
		opacity: 0.2;
	}
</style>
